This file gives monitor options for TextWare
The M.BAT batch file can be used for alternative monitors
other than VGA and Hercules.  It is a batch file that has
one parameter and is run at the DOS prompt like this:
M VGA_12
The above is equivalent to the VGA.BAT file provided.
Note that to view any image you MUST have 512 kbytes FREE
of RAM at run time.
Here are some other samples of running the M.BAT file:
CGA monitors:
M CGA_4
EGA Monitors:
M EGA_10
Extended VGA monitors:
M TS_29
M PAR_58
M V7_62
M ATI_54
(The above is for TSENG, PARADISE, VIDEO 7, or ATI video.)
Please note that case is important -- make sure the parameter
is in ALL CAPS.
